Distribution function of the standard normal distribution

x Φ(x) 0.0 0.5000 0.1 0.5398 0.2 0.5793 0.3 0.6179 0.4 0.6554 0.5 0.6915 0.6 0.7257 0.7 0.7580 0.8 0.7881 0.9 0.8159 1.0 0.8413 1.1 0.8643 1.2 0.8849 1.3 0.9032 1.4 0.9192 1.5 0.9332 1.6 0.9452 1.7 0.9554 1.8 0.9641 1.9 0.9713 2.0 0.9772 2.1 0.9821 2.2 0.9861 2.3 0.9893 2.4 0.9918 2.5 0.9938 2.6 0.9953 2.7 0.9965 2.8 0.9974 2.9 0.9981 3.0 0.9987 3.1 0.9990 3.2 0.9993 3.3 0.9995 3.4 0.9997 3.5 0.9998 3.6 0.9998 3.7 0.9999 3.8 0.9999 3.9 1.0000